\documentstyle[11pt]{book}

\oddsidemargin=0.75in
\evensidemargin=0.00in
\textwidth=5.75in
\topmargin=-0.25in
\textheight=9.00in
\topsep=2pt

\begin{document}
% Following is required by NASA a TM
%\pagestyle{plain}
\pagenumbering{arabic}

\input{chapt01}
\input{chapt02}
\input{chapt03}
\input{chapt04}
\input{chapt05}
\input{chapt06}
\input{chapt07}
\appendix
\input{appenda}
\input{appendb}
\input{appendc}
\input{appendd}
\input{appende}

% Remove following for NASA TM
\input{title}
\pagenumbering{roman}
\tableofcontents

\end{document}
